\documentclass[xcolor=usenames,dvipsnames,svgnames,table]{beamer}

\usepackage{lmodern}
\usepackage{amsmath}
\usepackage{tikz}
\usetikzlibrary{calc,positioning,arrows,shapes,intersections}
%\usepackage{subcaption}
\usepackage{siunitx}
\usepackage{multimedia}
\usepackage{listings}
\lstset{aboveskip=10pt,belowskip=10pt,lineskip={-1.5pt}}

\usepackage{multirow}
\usepackage{graphicx}
\usepackage{hyperref}

\usepackage{standalone}
\usepackage{media9}
\usepackage{smartdiagram}

\newcommand{\todo}[1]{{\color{red}~TODO!~{#1} }}

\usetheme{Warsaw}

\beamertemplatenavigationsymbolsempty%
\setbeamertemplate{footline}[frame number]
\setbeamertemplate{itemize item}[triangle]


\date{Jan 21, 2019}
\title{3D Radiative Heating Rates in Cloud Resolving Models -- Methods and Impact on Cloud Evolution and Organization of Convection}
\author[Jakub F., Mayer B.]{F.\,Jakub, M.\,Veerman, J.\,Schaefer, P.\,Gregor, F.\,Negwer, C.\,Klinger, B.\,Mayer }

\begin{document}


\input{../../slides/titlepage/slide}
%\input{../../slides/Errors_of_the_ICA/slide}
\input{../../slides/Compare_Mystic_vs_1D_and_Tenstream/slide}

\input{../../slides/caro_uclales_radiation_mode_comparison/slide}

\input{../../slides/shallow_cumulus_wind_shear/slide}
%\input{../../slides/cloud_streets_mechanism_sketch/slide}

\input{../../slides/shallow_cumulus_timeseries/slide}
%\input{../../slides/cloud_size_distribution/slide}

\input{../../slides/shallow_cumulus_srfcwind_organization/slide}
\input{../../slides/acor_3dxx_.26_5_movie/slide}


\input{../../slides/menno_timeseries_cloudcover_and_lwp/slide}
\input{../../slides/wetterstein_mystic_ts/slide}
\input{../../slides/janik_wrf_hill_wind/slide}
\input{../../slides/interaction_cloud_radiation_srfc_convection/slide}

%\input{../../slides/compare_plexrt_2str_vs_8str/slide}

%\input{../../slides/plex_ex1_edir/slide}
\input{../../slides/finish_1/slide}

\end{document}
